Index: DamOverall/trunk/doc/DAM - Architecture Overall/DAM - Architecture Overall.tex
===================================================================
diff -u -r4218 -r4250
--- DamOverall/trunk/doc/DAM - Architecture Overall/DAM - Architecture Overall.tex	(.../DAM - Architecture Overall.tex)	(revision 4218)
+++ DamOverall/trunk/doc/DAM - Architecture Overall/DAM - Architecture Overall.tex	(.../DAM - Architecture Overall.tex)	(revision 4250)
@@ -428,7 +428,8 @@
 This kernel is responsible for the piping failure mechanism.
 It is used by the \ProgramName Engine.
 
-This kernel should be released according to the steps for a BOI-release.
+When required, this kernel should be released according to the steps for a BOI-release.
+It is required when there is a new version of this kernel and it has been decided that DAM should use that version.
 Thereafter the dll's of this release should be merged as follows:
 \begin{itemize}
   \item In order to avoid the dll hell associated with multiple versions of the same standard dlls, the dlls that make up the wti piping dll are merged into one sigular dll with only access to the main dll methods. This way the dll hell is avoided.
